Nutrition Facts	Per 100g
Energy	320cal/1340 kj
Fat	0.0 g
From which Saturated fat	0.0 g
Carbohydrates	80.0 g
From which sugar	80.0 g
Proteins	1.67 g
Salt	0.0 g

300 g

e

BG-BIO-10
EU Agriculture

Acacia

Honey

Organic acacia honey
Unsuitable for infants below 12 months.

Country of origin: Bulgaria in the EU

Produced for: Isha Life Container Hotel, Indian Import Services, Isha Life, Wolga 14, 2491 Bj, The Hague, The Netherlands

Best Before:
LOT:

Organic Flower

Organic Flower Honey
Unsuitable for infants below 12 months.

Produced for: Isha Life Big Yellow self storage, 111 Whitby road, Slough, SL1 3DR, UK